P.L. Hurd — Errata 1

Errata — V-1.7 (October 7, 1997)

• Typo on page ii, first line, “disseration” should read “dissertation”. • Given names of the authors are limited to the first initial throughout the references (e.g. Hurd, P.L. is truncated to Hurd, P.) in the introductory chapter, paper IV, paper V & paper IV (pages 11 – 13, 50, 51, 64, 65, 85 – 87).

• Fourth last line on page 22 should read

“four possible pure stategies, giving rise” rather than “four possible pure stategies for each player, giving rise”.

• No capitalization within the titles throughout the references (e.g. the genus names are not capitalized) in papers V & VI (pages 64, 65, 85 – 87).

• Typo on page 27, first line, “princliple” should read “principle”. • Bad figure numbers on Page 31. The last sentence of 1st. paragraph of §3 should end in “figure 1.” not figure “1a.” The last sentence of the next paragraph shoud end in “these extreme colours (figure 2a).” not “(figure 1b)”. The following paragraph should end in “(figure 2b)” not “(figure 2a)”, and the one after that in “(figure 2c)” not “(figure 2b)”.

• Page 39, 1st. column, 2nd. paragraph, “a −C(0) has been added”, not

“a − C(0) was added” the “a” is not a variable, and was not added.

• The running head for paper VI (pages 73 – 88) reads “Paper IV”, but should read “Paper VI” • First sentence, page 78, and last citation on page 85, Capp & Searcy (1991); Searcy’s name is recorded as “W.A.” in the text and has gotten mangled to “W.A., S.” in the citation.

• Page 86, citation for Ellis, C.R., Jr. is a bit mangled, and out of alphabetical order.

• Typo on back cover, “deparment” should read “department”.

Updates

A current errata list can be found at:

http://toaster2.zool.su.se/thesis/thesis.html